P = 5, τ = 5 × 10^3, R = 6 × 10^5, P_m = 10

P = 5, τ = 5 × 10^3, R = 8 × 10^5, P_m = 3

P = 0.1, τ = 10^5, R = 6 × 10^6, P_m = 0.11